Chapter 3. Experimental Results 73

C1 C2

C3 C4

C5 C6

C7 C8

Figure 3.11: Scene 4, with a fixed-base robot which has 6 spherical joints (12 dof)

Chapter 3. Experimental Results 76

C1 C2

C3 C4

C5 C6

C7 C8

Figure 3.12: Scene 5, with a fixed-base robot which has 8 spherical joints (16 dof)